#!/usr/bin/perl5
#
# dhcp-relay.hlp
#
# Copyright 1988-1996 Silicon Graphics, Inc.
# All rights reserved.
#
# This is UNPUBLISHED PROPRIETARY SOURCE CODE of Silicon Graphics, Inc.;
# the contents of this file may not be disclosed to third parties, copied or
# duplicated in any form, in whole or in part, without the prior written
# permission of Silicon Graphics, Inc.
#
# RESTRICTED RIGHTS LEGEND:
# Use, duplication or disclosure by the Government is subject to restrictions
# as set forth in subdivision (c)(1)(ii) of the Rights in Technical Data
# and Computer Software clause at DFARS 252.227-7013, and/or in similar or
# successor clauses in the FAR, DOD or NASA FAR Supplement. Unpublished -
# rights reserved under the Copyright Laws of the United States.
#
# $Id: dhcp-relay.hlp,v 1.10 1997/04/17 21:23:03 shotes Exp $

print <<EndOfFile;
Content-type: text/html

<FORM>
<H2>Configuring a DHCP Relay Agent</H2>
<P>
The DHCP relay agent, <VAR>dhcp_relay</VAR>, runs on a system on each
network and forwards DHCP requests to the DHCP master server. To determine
the location of the DHCP server, <VAR>dhcp_relay</VAR> reads the
<VAR>/var/dhcp/config/dhcp_relay.servers</VAR> file, which contains a list
of DHCP server hostnames or addresses. 
</P>
<P>
Use the DHCP Relay Options form to manage relay agents and configure
<VAR>dhcp_relay</VAR> options:
</P>
<P>
<STRONG>Enable DHCP relay agent:</STRONG> This selection controls 
whether the relay agent should run on this system and forward requests
to the server. Select <VAR>Yes</VAR> to turn the relay agent on, and
select <VAR>No</VAR> to turn it off.
</P>
(Default value: No)
<P>
<STRONG>Add New Server:</STRONG> 
Use the field beside this button to enter a new DHCP server to which 
the relay agent can forward configuration requests.  To add a server, 
enter a hostname or an IP address in dotted decimal notation (such as 
1.2.3.4) notation and click <VAR>Add New Server</VAR>. Click the 
<VAR>Ok</VAR> button to put the changes into effect. 
</P>
(Default value: none)
<P>
<STRONG>Delete Existing Server:</STRONG> This selection 
removes a server from the DHCP server list, preventing the relay agent from
forwarding configuration requests to the server. To remove a server,
select its name or IP address from the DHCP server list and click
<VAR>Delete Existing Server</VAR>; then click the <VAR>Ok</VAR> button.
</P>
(Default value: none)
<CENTER>
<INPUT TYPE="button" VALUE="Back to Form" onClick="self.history.go(-1)">
</CENTER>
</FORM>

EndOfFile

